[2J                     Net USE HELP FILE                          May 1, 1985

NET USE                                      -Prints the connection list

NET USE <x>: \\FS<statid>\<user> [password]  -Connects drive X to remote
                                              user's directory on FS statid

NET USE <x>: /D                              -Disconnects drive x from the
                                              network

NET USE <prn>: \\PS<statid>\<pname>          -Connects local printer PRN to
                                              network printer PNAME on STATID

NET USE <prn>: /D                            -Disconnects printer device PRN

NET USE \\FS<statid>\<user> [password]       -Connects to remote directory

NET USE \\FS<statid>\<user> /D               -Disconnects from remote directory

NET USE HELP                                 -Prints this text
